prompt --application/pages/page_00013
begin
--   Manifest
--     PAGE: 00013
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2023.04.28'
,p_release=>'23.1.0'
,p_default_workspace_id=>16017191443360494
,p_default_application_id=>10002
,p_default_id_offset=>0
,p_default_owner=>'STUDENT'
);
wwv_flow_imp_page.create_page(
 p_id=>13.10002
,p_name=>unistr('\82F1\8BED\5355\8BCD')
,p_alias=>'ENGLISH-VERB'
,p_step_title=>unistr('\82F1\8BED\5355\8BCD')
,p_autocomplete_on_off=>'OFF'
,p_page_template_options=>'#DEFAULT#'
,p_protection_level=>'C'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(18614610902137640.10002)
,p_plug_name=>'Breadcrumb'
,p_region_template_options=>'#DEFAULT#:t-BreadcrumbRegion--useBreadcrumbTitle'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16128864886514872.10002)
,p_plug_display_sequence=>10
,p_plug_display_point=>'REGION_POSITION_01'
,p_menu_id=>wwv_flow_imp.id(16026011791514304.10002)
,p_plug_source_type=>'NATIVE_BREADCRUMB'
,p_menu_template_id=>wwv_flow_imp.id(16190976226515102.10002)
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(18615203934137675.10002)
,p_plug_name=>unistr('\82F1\8BED\5355\8BCD')
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16112462865514800.10002)
,p_plug_display_sequence=>20
,p_query_type=>'TABLE'
,p_query_table=>'STDT_EN_VERB_TENSES'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_prn_page_header=>unistr('\82F1\8BED\5355\8BCD')
);
wwv_flow_imp_page.create_region_column_group(
 p_id=>wwv_flow_imp.id(16705113937764232.10002)
,p_heading=>unistr('\8FC7\53BB\5F0F')
);
wwv_flow_imp_page.create_region_column_group(
 p_id=>wwv_flow_imp.id(16705235933764233.10002)
,p_heading=>unistr('\8FC7\53BB\5206\8BCD(\5B8C\6210\65F6)')
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18616549671137709.10002)
,p_name=>'APEX$ROW_SELECTOR'
,p_item_type=>'NATIVE_ROW_SELECTOR'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_attribute_02=>'Y'
,p_attribute_03=>'N'
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18616905269137725.10002)
,p_name=>'APEX$ROW_ACTION'
,p_item_type=>'NATIVE_ROW_ACTION'
,p_label=>'Actions'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>20
,p_value_alignment=>'CENTER'
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18617906311137736.10002)
,p_name=>'VERB_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VERB_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>30
,p_attribute_01=>'Y'
,p_enable_filter=>false
,p_enable_hide=>true
,p_is_primary_key=>true
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18618971032137739.10002)
,p_name=>'VERB_NAME'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VERB_NAME'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>unistr('\5355\8BCD\540D')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>40
,p_value_alignment=>'LEFT'
,p_attribute_01=>'N'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'TEXT'
,p_attribute_05=>'BOTH'
,p_is_required=>true
,p_max_length=>240
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18619934201137741.10002)
,p_name=>'TRANSLATION'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TRANSLATION'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\7FFB\8BD1')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>50
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>true
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18620919721137743.10002)
,p_name=>'PAST_TENSE_1'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PAST_TENSE_1'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5F0F 1')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>60
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>true
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18621905872137746.10002)
,p_name=>'PAST_TENSE_2'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PAST_TENSE_2'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5F0F 2')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>70
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18622954803137752.10002)
,p_name=>'PAST_TENSE_3'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PAST_TENSE_3'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5F0F 3')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>80
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18623967578137754.10002)
,p_name=>'PERFECT_TENSE_1'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PERFECT_TENSE_1'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5206\8BCD(\5B8C\6210\65F6) 1')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>90
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>true
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18624947019137756.10002)
,p_name=>'PERFECT_TENSE_2'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PERFECT_TENSE_2'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5206\8BCD(\5B8C\6210\65F6) 2')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>100
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18625998730137758.10002)
,p_name=>'PERFECT_TENSE_3'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PERFECT_TENSE_3'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\8FC7\53BB\5206\8BCD(\5B8C\6210\65F6) 3')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>110
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18626979576137760.10002)
,p_name=>'CREATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>120
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18627938500137767.10002)
,p_name=>'CREATION_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATION_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>130
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18628991124137770.10002)
,p_name=>'LAST_UPDATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>140
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(18629936381137776.10002)
,p_name=>'LAST_UPDATE_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATE_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>150
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_interactive_grid(
 p_id=>wwv_flow_imp.id(18615762595137679.10002)
,p_internal_uid=>18615762595137679
,p_is_editable=>true
,p_edit_operations=>'i:u:d'
,p_lost_update_check_type=>'VALUES'
,p_add_row_if_empty=>true
,p_submit_checked_rows=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>true
,p_fixed_row_height=>true
,p_pagination_type=>'SCROLL'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
,p_javascript_code=>wwv_flow_string.join(wwv_flow_t_varchar2(
'function(config) {',
'',
'    let toolbarData = $.apex.interactiveGrid.copyDefaultToolbar();',
'    let toolbarGroup = toolbarData.toolbarFind("actions3");',
'',
'    toolbarGroup.controls.push({',
'        action: "mass-load",',
'        type: "BUTTON",',
unistr('        label: "\6279\91CF\5BFC\5165"'),
'    });',
'',
'    config.initActions = function (actions) { ',
'        actions.add({ ',
'            name: "mass-load", ',
'            action: function(event, focusElement) { ',
'                //APEX.message.alert(''mass-load'');',
'                //apex.navigation.redirect("f?p=&APP_ID.:14:&APP_SESSION.::&DEBUG.:::");',
'                $.event.trigger(''massLoad'');',
'            }',
'        });',
'    } ',
'',
'    config.toolbarData = toolbarData;',
'',
'    return config; ',
'}'))
);
wwv_flow_imp_page.create_page_branch(
 p_id=>wwv_flow_imp.id(16705848148764239.10002)
,p_branch_name=>'Navigate to Mass Load'
,p_branch_action=>'f?p=&APP_ID.:14:&SESSION.::&DEBUG.:::&success_msg=#SUCCESS_MSG#'
,p_branch_point=>'AFTER_PROCESSING'
,p_branch_type=>'REDIRECT_URL'
,p_branch_sequence=>10
,p_branch_condition_type=>'REQUEST_EQUALS_CONDITION'
,p_branch_condition=>'massLoad'
);
wwv_flow_imp_page.create_page_da_event(
 p_id=>wwv_flow_imp.id(16705545578764236.10002)
,p_name=>'Mass Load'
,p_event_sequence=>10
,p_triggering_element_type=>'JAVASCRIPT_EXPRESSION'
,p_triggering_element=>'document'
,p_bind_type=>'bind'
,p_execution_type=>'IMMEDIATE'
,p_bind_event_type=>'custom'
,p_bind_event_type_custom=>'massLoad'
);
wwv_flow_imp_page.create_page_da_action(
 p_id=>wwv_flow_imp.id(16705697486764237.10002)
,p_event_id=>wwv_flow_imp.id(16705545578764236.10002)
,p_event_result=>'TRUE'
,p_action_sequence=>10
,p_execute_on_page_init=>'N'
,p_action=>'NATIVE_SUBMIT_PAGE'
,p_attribute_01=>'massLoad'
,p_attribute_02=>'Y'
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(18630918154137801.10002)
,p_process_sequence=>10
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(18615203934137675.10002)
,p_process_type=>'NATIVE_IG_DML'
,p_process_name=>'English Verb - Save Interactive Grid Data'
,p_attribute_01=>'REGION_SOURCE'
,p_attribute_05=>'Y'
,p_attribute_06=>'Y'
,p_attribute_08=>'Y'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>18630918154137801.10002
);
wwv_flow_imp.component_end;
end;
/
