
   CREATE SEQUENCE  "STDT_EXAM_RESULTS_SEQ"  MINVALUE 1 MAXVALUE 9999999999999999999999999999 INCREMENT BY 1 START WITH 161 CACHE 20 NOORDER  NOCYCLE  NOKEEP  NOSCALE  GLOBAL ;