prompt --application/pages/page_00004
begin
--   Manifest
--     PAGE: 00004
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2023.04.28'
,p_release=>'23.1.0'
,p_default_workspace_id=>16017191443360494
,p_default_application_id=>10001
,p_default_id_offset=>0
,p_default_owner=>'STUDENT'
);
wwv_flow_imp_page.create_page(
 p_id=>4
,p_name=>'Term'
,p_alias=>'TERM'
,p_step_title=>'Term'
,p_autocomplete_on_off=>'OFF'
,p_page_template_options=>'#DEFAULT#'
,p_protection_level=>'C'
,p_page_component_map=>'21'
,p_last_updated_by=>'STUDENT_DEV'
,p_last_upd_yyyymmddhh24miss=>'20230726154444'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(16377626909447657)
,p_plug_name=>'Term'
,p_region_template_options=>'#DEFAULT#'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16112462865514800)
,p_plug_display_sequence=>20
,p_query_type=>'TABLE'
,p_query_table=>'STDT_TERMS'
,p_query_where=>wwv_flow_string.join(wwv_flow_t_varchar2(
'tenant_id = (SELECT tenant_id',
'             FROM   stdt_users su',
'             WHERE  su.user_name = :APP_USER)'))
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_prn_page_header=>'Term'
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16378942874447659)
,p_name=>'APEX$ROW_SELECTOR'
,p_item_type=>'NATIVE_ROW_SELECTOR'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_attribute_02=>'Y'
,p_attribute_03=>'N'
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16379420572447660)
,p_name=>'APEX$ROW_ACTION'
,p_item_type=>'NATIVE_ROW_ACTION'
,p_label=>'Actions'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>20
,p_value_alignment=>'CENTER'
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16380490640447665)
,p_name=>'TERM_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TERM_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>30
,p_attribute_01=>'Y'
,p_enable_filter=>false
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>true
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16381439563447667)
,p_name=>'STUDENT_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'STUDENT_ID'
,p_data_type=>'NUMBER'
,p_is_query_only=>false
,p_item_type=>'NATIVE_SELECT_LIST'
,p_heading=>'Student'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>40
,p_value_alignment=>'LEFT'
,p_is_required=>true
,p_lov_type=>'SHARED'
,p_lov_id=>wwv_flow_imp.id(16427841110660741)
,p_lov_display_extra=>true
,p_lov_display_null=>true
,p_lov_null_text=>'-- Select Student --'
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'LOV'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16382472122447674)
,p_name=>'TERM_NAME'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TERM_NAME'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Term Name'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>50
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>true
,p_max_length=>240
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16383455647447675)
,p_name=>'TERM_START_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TERM_START_DATE'
,p_data_type=>'DATE'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DATE_PICKER_APEX'
,p_heading=>'Term Start Date'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>60
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_attribute_12=>'MONTH-PICKER:YEAR-PICKER'
,p_attribute_13=>'VISIBLE'
,p_attribute_15=>'FOCUS'
,p_is_required=>true
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16384490514447677)
,p_name=>'TERM_END_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TERM_END_DATE'
,p_data_type=>'DATE'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DATE_PICKER_APEX'
,p_heading=>'Term End Date'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>70
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_attribute_12=>'MONTH-PICKER:YEAR-PICKER'
,p_attribute_13=>'VISIBLE'
,p_attribute_15=>'FOCUS'
,p_is_required=>true
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16385493655447679)
,p_name=>'CREATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DISPLAY_ONLY'
,p_heading=>'Created By'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>80
,p_value_alignment=>'LEFT'
,p_attribute_02=>'VALUE'
,p_attribute_05=>'PLAIN'
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16386464212447681)
,p_name=>'CREATION_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATION_DATE'
,p_data_type=>'TIMESTAMP'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DISPLAY_ONLY'
,p_heading=>'Creation Date'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>90
,p_value_alignment=>'LEFT'
,p_attribute_02=>'VALUE'
,p_attribute_05=>'PLAIN'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16387416294447683)
,p_name=>'LAST_UPDATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DISPLAY_ONLY'
,p_heading=>'Last Updated By'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>100
,p_value_alignment=>'LEFT'
,p_attribute_02=>'VALUE'
,p_attribute_05=>'PLAIN'
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(16388438578447684)
,p_name=>'LAST_UPDATE_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATE_DATE'
,p_data_type=>'TIMESTAMP'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DISPLAY_ONLY'
,p_heading=>'Last Update Date'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>110
,p_value_alignment=>'LEFT'
,p_attribute_02=>'VALUE'
,p_attribute_05=>'PLAIN'
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19446348210876432)
,p_name=>'TENANT_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TENANT_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>120
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>false
,p_default_type=>'SQL_QUERY'
,p_default_expression=>wwv_flow_string.join(wwv_flow_t_varchar2(
'SELECT',
'    st.tenant_id',
'FROM',
'    stdt_tenants    st,',
'    stdt_users      su',
'WHERE',
'    su.tenant_id = st.tenant_id',
'AND su.user_name = :APP_USER'))
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_interactive_grid(
 p_id=>wwv_flow_imp.id(16378171646447658)
,p_internal_uid=>16378171646447658
,p_is_editable=>true
,p_edit_operations=>'i:u:d'
,p_lost_update_check_type=>'VALUES'
,p_add_row_if_empty=>true
,p_submit_checked_rows=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>true
,p_fixed_row_height=>true
,p_pagination_type=>'SCROLL'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
);
wwv_flow_imp_page.create_ig_report(
 p_id=>wwv_flow_imp.id(16378571150447658)
,p_interactive_grid_id=>wwv_flow_imp.id(16378171646447658)
,p_static_id=>'163786'
,p_type=>'PRIMARY'
,p_default_view=>'GRID'
,p_show_row_number=>false
,p_settings_area_expanded=>true
);
wwv_flow_imp_page.create_ig_report_view(
 p_id=>wwv_flow_imp.id(16378794103447659)
,p_report_id=>wwv_flow_imp.id(16378571150447658)
,p_view_type=>'GRID'
,p_stretch_columns=>true
,p_srv_exclude_null_values=>false
,p_srv_only_display_columns=>true
,p_edit_mode=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16379852256447661)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>0
,p_column_id=>wwv_flow_imp.id(16379420572447660)
,p_is_visible=>true
,p_is_frozen=>true
,p_width=>40
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16380809617447666)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>1
,p_column_id=>wwv_flow_imp.id(16380490640447665)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16381805087447673)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>2
,p_column_id=>wwv_flow_imp.id(16381439563447667)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>80
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16382825750447674)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>3
,p_column_id=>wwv_flow_imp.id(16382472122447674)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>120
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16383833912447676)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>4
,p_column_id=>wwv_flow_imp.id(16383455647447675)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>100
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16384866946447678)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>5
,p_column_id=>wwv_flow_imp.id(16384490514447677)
,p_is_visible=>true
,p_is_frozen=>false
,p_width=>100
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16385833519447680)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>6
,p_column_id=>wwv_flow_imp.id(16385493655447679)
,p_is_visible=>false
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16386818612447682)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>7
,p_column_id=>wwv_flow_imp.id(16386464212447681)
,p_is_visible=>false
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16387843033447683)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>8
,p_column_id=>wwv_flow_imp.id(16387416294447683)
,p_is_visible=>false
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(16388830125447685)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>9
,p_column_id=>wwv_flow_imp.id(16388438578447684)
,p_is_visible=>false
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(19707217465486148)
,p_view_id=>wwv_flow_imp.id(16378794103447659)
,p_display_seq=>10
,p_column_id=>wwv_flow_imp.id(19446348210876432)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(18864629343320287)
,p_plug_name=>'Term'
,p_icon_css_classes=>'app-icon'
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16094697015514771)
,p_plug_display_sequence=>1
,p_plug_display_point=>'REGION_POSITION_01'
,p_attribute_01=>'N'
,p_attribute_02=>'HTML'
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(16389460547447686)
,p_process_sequence=>10
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(16377626909447657)
,p_process_type=>'NATIVE_IG_DML'
,p_process_name=>'Term - Save Interactive Grid Data'
,p_attribute_01=>'REGION_SOURCE'
,p_attribute_05=>'Y'
,p_attribute_06=>'Y'
,p_attribute_08=>'Y'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>16389460547447686
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(19127100211169019)
,p_process_sequence=>20
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(16377626909447657)
,p_process_type=>'NATIVE_PLSQL'
,p_process_name=>'Update Who Columns'
,p_process_sql_clob=>wwv_flow_string.join(wwv_flow_t_varchar2(
'DECLARE',
'',
'BEGIN',
'    IF (:APEX$ROW_STATUS = ''U'') THEN',
'        UPDATE',
'            stdt_terms st',
'        SET',
'            last_update_date = LOCALTIMESTAMP,',
'            last_updated_by = :APP_USER',
'        WHERE',
'            term_id = :TERM_ID;',
'    END IF;',
'',
'END;'))
,p_process_clob_language=>'PLSQL'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>19127100211169019
);
wwv_flow_imp.component_end;
end;
/
