prompt --application/pages/page_00090
begin
--   Manifest
--     PAGE: 00090
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2023.04.28'
,p_release=>'23.1.0'
,p_default_workspace_id=>16017191443360494
,p_default_application_id=>10002
,p_default_id_offset=>0
,p_default_owner=>'STUDENT'
);
wwv_flow_imp_page.create_page(
 p_id=>90.10002
,p_name=>unistr('\79DF\6237')
,p_alias=>'TENANT'
,p_step_title=>unistr('\79DF\6237')
,p_autocomplete_on_off=>'OFF'
,p_page_template_options=>'#DEFAULT#'
,p_protection_level=>'C'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(19614909222253327.10002)
,p_plug_name=>unistr('\79DF\6237')
,p_icon_css_classes=>'app-icon'
,p_region_template_options=>'#DEFAULT#'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16094697015514771.10002)
,p_plug_display_sequence=>10
,p_include_in_reg_disp_sel_yn=>'Y'
,p_plug_display_point=>'REGION_POSITION_01'
,p_menu_id=>wwv_flow_imp.id(16026011791514304.10002)
,p_plug_source_type=>'NATIVE_BREADCRUMB'
,p_menu_template_id=>wwv_flow_imp.id(16190976226515102.10002)
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(19615553297253331.10002)
,p_plug_name=>unistr('\79DF\6237 (Admin Only)')
,p_region_template_options=>'#DEFAULT#'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(16112462865514800.10002)
,p_plug_display_sequence=>10
,p_query_type=>'TABLE'
,p_query_table=>'STDT_TENANTS'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_plug_display_condition_type=>'FUNCTION_BODY'
,p_plug_display_when_condition=>wwv_flow_string.join(wwv_flow_t_varchar2(
'DECLARE',
'    lv_admin_flag VARCHAR2(1);',
'BEGIN',
'    SELECT admin_flag',
'    INTO   lv_admin_flag',
'    FROM   stdt_users',
'    WHERE  user_name = :APP_USER;',
'',
'    IF (lv_admin_flag = ''Y'') THEN',
'        RETURN TRUE;',
'    ELSE',
'        RETURN FALSE;',
'    END IF;',
'EXCEPTION',
'    WHEN OTHERS THEN',
'        RETURN FALSE;',
'END;'))
,p_plug_display_when_cond2=>'PLSQL'
,p_prn_content_disposition=>'ATTACHMENT'
,p_prn_units=>'INCHES'
,p_prn_paper_size=>'LETTER'
,p_prn_width=>11
,p_prn_height=>8.5
,p_prn_orientation=>'HORIZONTAL'
,p_prn_page_header=>unistr('\79DF\6237(\9650\7BA1\7406\5458)')
,p_prn_page_header_font_color=>'#000000'
,p_prn_page_header_font_family=>'Helvetica'
,p_prn_page_header_font_weight=>'normal'
,p_prn_page_header_font_size=>'12'
,p_prn_page_footer_font_color=>'#000000'
,p_prn_page_footer_font_family=>'Helvetica'
,p_prn_page_footer_font_weight=>'normal'
,p_prn_page_footer_font_size=>'12'
,p_prn_header_bg_color=>'#EEEEEE'
,p_prn_header_font_color=>'#000000'
,p_prn_header_font_family=>'Helvetica'
,p_prn_header_font_weight=>'bold'
,p_prn_header_font_size=>'10'
,p_prn_body_bg_color=>'#FFFFFF'
,p_prn_body_font_color=>'#000000'
,p_prn_body_font_family=>'Helvetica'
,p_prn_body_font_weight=>'normal'
,p_prn_body_font_size=>'10'
,p_prn_border_width=>.5
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19445539126876424.10002)
,p_name=>'APEX$ROW_ACTION'
,p_item_type=>'NATIVE_ROW_ACTION'
,p_display_sequence=>20
,p_use_as_row_header=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19445640603876425.10002)
,p_name=>'APEX$ROW_SELECTOR'
,p_item_type=>'NATIVE_ROW_SELECTOR'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_attribute_02=>'Y'
,p_attribute_03=>'N'
,p_use_as_row_header=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19616835225253676.10002)
,p_name=>'TENANT_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TENANT_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>30
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_is_primary_key=>true
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19617717616253681.10002)
,p_name=>'TENANT_NAME'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TENANT_NAME'
,p_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>unistr('\79DF\6237\540D\79F0')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>40
,p_value_alignment=>'LEFT'
,p_attribute_05=>'BOTH'
,p_is_required=>true
,p_max_length=>240
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19618755159253683.10002)
,p_name=>'TENANT_DESCRIPTION'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TENANT_DESCRIPTION'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>unistr('\79DF\6237\63CF\8FF0')
,p_heading_alignment=>'LEFT'
,p_display_sequence=>50
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>2000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19619756441253684.10002)
,p_name=>'EFFECTIVE_FROM_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'EFFECTIVE_FROM_DATE'
,p_data_type=>'DATE'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DATE_PICKER_APEX'
,p_heading=>unistr('\6709\6548\65E5\671F\4ECE')
,p_heading_alignment=>'CENTER'
,p_display_sequence=>60
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_is_required=>false
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19620762200253686.10002)
,p_name=>'EFFECTIVE_TO_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'EFFECTIVE_TO_DATE'
,p_data_type=>'DATE'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DATE_PICKER_APEX'
,p_heading=>unistr('\6709\6548\65E5\671F\81F3')
,p_heading_alignment=>'CENTER'
,p_display_sequence=>70
,p_value_alignment=>'CENTER'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_is_required=>false
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19621728550253688.10002)
,p_name=>'CREATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>80
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19622769761253689.10002)
,p_name=>'CREATION_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATION_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>90
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19623731778253691.10002)
,p_name=>'LAST_UPDATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>100
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(19624792121253693.10002)
,p_name=>'LAST_UPDATE_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATE_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>110
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_interactive_grid(
 p_id=>wwv_flow_imp.id(19616003675253334.10002)
,p_internal_uid=>19616003675253334
,p_is_editable=>true
,p_edit_operations=>'i:u:d'
,p_lost_update_check_type=>'VALUES'
,p_add_row_if_empty=>true
,p_submit_checked_rows=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>true
,p_fixed_row_height=>true
,p_pagination_type=>'SCROLL'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(19445749630876426.10002)
,p_process_sequence=>10
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(19615553297253331.10002)
,p_process_type=>'NATIVE_IG_DML'
,p_process_name=>'Tenant - Save Interactive Grid Data'
,p_attribute_01=>'REGION_SOURCE'
,p_attribute_05=>'Y'
,p_attribute_06=>'Y'
,p_attribute_08=>'Y'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>19445749630876426.10002
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(19127847299169026.10002)
,p_process_sequence=>20
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(19615553297253331.10002)
,p_process_type=>'NATIVE_PLSQL'
,p_process_name=>'Update Who Columns'
,p_process_sql_clob=>wwv_flow_string.join(wwv_flow_t_varchar2(
'DECLARE',
'',
'BEGIN',
'    IF (:APEX$ROW_STATUS = ''U'') THEN',
'        UPDATE',
'            stdt_tenants st',
'        SET',
'            last_update_date = LOCALTIMESTAMP,',
'            last_updated_by = :APP_USER',
'        WHERE',
'            tenant_id = :TENANT_ID;',
'    END IF;',
'',
'END;'))
,p_process_clob_language=>'PLSQL'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>19127847299169026.10002
);
wwv_flow_imp.component_end;
end;
/
