prompt --application/shared_components/user_interface/lovs/feedback_status
begin
--   Manifest
--     FEEDBACK_STATUS
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2024.05.31'
,p_release=>'24.1.2'
,p_default_workspace_id=>5893639279394007
,p_default_application_id=>20011
,p_default_id_offset=>0
,p_default_owner=>'DEMO'
);
wwv_flow_imp_shared.create_list_of_values(
 p_id=>wwv_flow_imp.id(10358799773633320)
,p_lov_name=>'FEEDBACK_STATUS'
,p_lov_query=>'.'||wwv_flow_imp.id(10358799773633320)||'.'
,p_location=>'STATIC'
,p_version_scn=>1
);
wwv_flow_imp_shared.create_static_lov_data(
 p_id=>wwv_flow_imp.id(10359031993633320)
,p_lov_disp_sequence=>1
,p_lov_disp_value=>'No Action'
,p_lov_return_value=>'0'
);
wwv_flow_imp_shared.create_static_lov_data(
 p_id=>wwv_flow_imp.id(10359445478633321)
,p_lov_disp_sequence=>2
,p_lov_disp_value=>'Acknowledged'
,p_lov_return_value=>'1'
);
wwv_flow_imp_shared.create_static_lov_data(
 p_id=>wwv_flow_imp.id(10359834904633322)
,p_lov_disp_sequence=>3
,p_lov_disp_value=>'Open'
,p_lov_return_value=>'3'
);
wwv_flow_imp_shared.create_static_lov_data(
 p_id=>wwv_flow_imp.id(10360260762633323)
,p_lov_disp_sequence=>4
,p_lov_disp_value=>'Closed'
,p_lov_return_value=>'4'
);
wwv_flow_imp.component_end;
end;
/
