prompt --application/pages/page_10000
begin
--   Manifest
--     PAGE: 10000
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2024.05.31'
,p_release=>'24.1.2'
,p_default_workspace_id=>5893639279394007
,p_default_application_id=>20011
,p_default_id_offset=>0
,p_default_owner=>'DEMO'
);
wwv_flow_imp_page.create_page(
 p_id=>10000
,p_name=>'Administration'
,p_alias=>'ADMINISTRATION'
,p_step_title=>'Administration'
,p_autocomplete_on_off=>'OFF'
,p_group_id=>wwv_flow_imp.id(10323519869632584)
,p_page_template_options=>'#DEFAULT#'
,p_required_role=>wwv_flow_imp.id(10322946272632526)
,p_protection_level=>'C'
,p_deep_linking=>'N'
,p_help_text=>wwv_flow_string.join(wwv_flow_t_varchar2(
'<p>The administration page allows application owners (Administrators) to configure the application and maintain common data used across the application.',
'By selecting one of the available settings, administrators can potentially change how the application is displayed and/or features available to the end users.</p>',
'<p>Access to this page should be limited to Administrators only.</p>'))
,p_page_component_map=>'03'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10383923069633493)
,p_plug_name=>'Breadcrumb'
,p_region_template_options=>'#DEFAULT#:t-BreadcrumbRegion--useBreadcrumbTitle'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(10145238625629609)
,p_plug_display_sequence=>10
,p_plug_display_point=>'REGION_POSITION_01'
,p_menu_id=>wwv_flow_imp.id(10029580740629034)
,p_plug_source_type=>'NATIVE_BREADCRUMB'
,p_menu_template_id=>wwv_flow_imp.id(10207649640629828)
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10385943160633538)
,p_plug_name=>'Column 1'
,p_region_template_options=>'#DEFAULT#'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_imp.id(10067642234629347)
,p_plug_display_sequence=>10
,p_plug_query_num_rows=>15
,p_attributes=>wwv_flow_t_plugin_attributes(wwv_flow_t_varchar2(
  'expand_shortcuts', 'N',
  'output_as', 'HTML',
  'show_line_breaks', 'Y')).to_clob
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10386376770633540)
,p_plug_name=>'Configuration'
,p_parent_plug_id=>wwv_flow_imp.id(10385943160633538)
,p_region_template_options=>'#DEFAULT#:t-Region--noPadding:t-Region--scrollBody'
,p_component_template_options=>'#DEFAULT#:u-colors'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_imp.id(10132850710629585)
,p_plug_display_sequence=>40
,p_list_id=>wwv_flow_imp.id(10384575174633535)
,p_plug_source_type=>'NATIVE_LIST'
,p_list_template_id=>wwv_flow_imp.id(10187815072629739)
,p_plug_query_num_rows=>15
,p_required_patch=>wwv_flow_imp.id(10321742078632488)
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10386754609633545)
,p_plug_name=>'Column 2'
,p_region_template_options=>'#DEFAULT#'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_imp.id(10067642234629347)
,p_plug_display_sequence=>20
,p_plug_new_grid_row=>false
,p_plug_query_num_rows=>15
,p_attributes=>wwv_flow_t_plugin_attributes(wwv_flow_t_varchar2(
  'expand_shortcuts', 'N',
  'output_as', 'HTML',
  'show_line_breaks', 'Y')).to_clob
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10387167285633546)
,p_plug_name=>'Feedback'
,p_parent_plug_id=>wwv_flow_imp.id(10386754609633545)
,p_region_template_options=>'#DEFAULT#:t-Region--noPadding:t-Region--scrollBody'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_imp.id(10132850710629585)
,p_plug_display_sequence=>50
,p_plug_query_num_rows=>15
,p_required_patch=>wwv_flow_imp.id(10321559262632488)
,p_attributes=>wwv_flow_t_plugin_attributes(wwv_flow_t_varchar2(
  'expand_shortcuts', 'N',
  'output_as', 'HTML',
  'show_line_breaks', 'Y')).to_clob
);
wwv_flow_imp_page.create_report_region(
 p_id=>wwv_flow_imp.id(10387559156633548)
,p_name=>'Report'
,p_parent_plug_id=>wwv_flow_imp.id(10387167285633546)
,p_template=>wwv_flow_imp.id(10132850710629585)
,p_display_sequence=>10
,p_region_template_options=>'#DEFAULT#:t-Region--removeHeader:t-Region--stacked:t-Region--scrollBody:t-Region--noPadding'
,p_component_template_options=>'#DEFAULT#:t-AVPList--rightAligned'
,p_source_type=>'NATIVE_SQL_REPORT'
,p_query_type=>'SQL'
,p_source=>wwv_flow_string.join(wwv_flow_t_varchar2(
'select l.display_value feedback_status, ',
'(select count(*) from apex_team_feedback f where f.application_id = :APP_ID and f.feedback_status = l.return_value) feedback_count ',
'from apex_application_lov_entries l',
'where l.application_id = :APP_ID',
'and l.list_of_values_name = ''FEEDBACK_STATUS''',
'order by 2 desc, 1'))
,p_ajax_enabled=>'Y'
,p_lazy_loading=>false
,p_query_row_template=>wwv_flow_imp.id(10176089039629693)
,p_query_options=>'DERIVED_REPORT_COLUMNS'
,p_query_no_data_found=>'no data found'
,p_query_row_count_max=>500
);
wwv_flow_imp_page.create_report_columns(
 p_id=>wwv_flow_imp.id(10388225056633587)
,p_query_column_id=>1
,p_column_alias=>'FEEDBACK_STATUS'
,p_column_display_sequence=>1
,p_column_heading=>'Feedback Status'
,p_use_as_row_header=>'N'
,p_heading_alignment=>'LEFT'
);
wwv_flow_imp_page.create_report_columns(
 p_id=>wwv_flow_imp.id(10388680390633598)
,p_query_column_id=>2
,p_column_alias=>'FEEDBACK_COUNT'
,p_column_display_sequence=>2
,p_column_heading=>'Feedback Count'
,p_use_as_row_header=>'N'
,p_column_format=>'999G999G999G999G999G999G990'
,p_heading_alignment=>'LEFT'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10390324204633707)
,p_plug_name=>'Feedback'
,p_parent_plug_id=>wwv_flow_imp.id(10387167285633546)
,p_region_template_options=>'#DEFAULT#'
,p_component_template_options=>'#DEFAULT#:u-colors'
,p_escape_on_http_output=>'Y'
,p_plug_template=>wwv_flow_imp.id(10066208585629345)
,p_plug_display_sequence=>20
,p_list_id=>wwv_flow_imp.id(10385260648633537)
,p_plug_source_type=>'NATIVE_LIST'
,p_list_template_id=>wwv_flow_imp.id(10187815072629739)
,p_plug_query_num_rows=>15
);
wwv_flow_imp.component_end;
end;
/
