prompt --application/pages/page_00902
begin
--   Manifest
--     PAGE: 00902
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2024.05.31'
,p_release=>'24.1.2'
,p_default_workspace_id=>5893639279394007
,p_default_application_id=>20011
,p_default_id_offset=>0
,p_default_owner=>'DEMO'
);
wwv_flow_imp_page.create_page(
 p_id=>902
,p_name=>'Model'
,p_alias=>'MODEL'
,p_step_title=>'Model'
,p_autocomplete_on_off=>'OFF'
,p_page_template_options=>'#DEFAULT#'
,p_protection_level=>'C'
,p_page_component_map=>'21'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10413518567995362)
,p_plug_name=>'Model'
,p_region_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(10123076177629564)
,p_plug_display_sequence=>20
,p_query_type=>'TABLE'
,p_query_table=>'CB_MODELS'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_prn_page_header=>'Model'
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10393423205674614)
,p_name=>'READY_FOR_CHAT'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'READY_FOR_CHAT'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_SELECT_LIST'
,p_heading=>'Ready for Chat'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>180
,p_value_alignment=>'LEFT'
,p_is_required=>false
,p_lov_type=>'SHARED'
,p_lov_id=>wwv_flow_imp.id(10433015047005697)
,p_lov_display_extra=>false
,p_lov_display_null=>false
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'LOV'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10414812824995379)
,p_name=>'APEX$ROW_SELECTOR'
,p_session_state_data_type=>'VARCHAR2'
,p_item_type=>'NATIVE_ROW_SELECTOR'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_attribute_02=>'Y'
,p_attribute_03=>'N'
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10415300725995382)
,p_name=>'APEX$ROW_ACTION'
,p_session_state_data_type=>'VARCHAR2'
,p_item_type=>'NATIVE_ROW_ACTION'
,p_label=>'Actions'
,p_heading_alignment=>'CENTER'
,p_display_sequence=>20
,p_value_alignment=>'CENTER'
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10416316613995391)
,p_name=>'MODEL_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'MODEL_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>30
,p_attribute_01=>'Y'
,p_enable_filter=>false
,p_use_as_row_header=>false
,p_enable_hide=>true
,p_is_primary_key=>true
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10417343103995407)
,p_name=>'MODEL_NAME'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'MODEL_NAME'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>'Model Name'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>40
,p_value_alignment=>'LEFT'
,p_attribute_01=>'N'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'TEXT'
,p_attribute_05=>'BOTH'
,p_is_required=>true
,p_max_length=>240
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10418221063995410)
,p_name=>'MODEL_DESCRIPTION'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'MODEL_DESCRIPTION'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Model Description'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>50
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>4000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10419257188995413)
,p_name=>'VENDOR_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VENDOR_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_SELECT_LIST'
,p_heading=>'Vendor Id'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>60
,p_value_alignment=>'LEFT'
,p_is_required=>false
,p_lov_type=>'SHARED'
,p_lov_id=>wwv_flow_imp.id(10435138725013848)
,p_lov_display_extra=>false
,p_lov_display_null=>true
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'LOV'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10420258739995419)
,p_name=>'LAUNCH_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAUNCH_DATE'
,p_data_type=>'DATE'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_DATE_PICKER_APEX'
,p_heading=>'Launch Date'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>70
,p_value_alignment=>'LEFT'
,p_attribute_01=>'N'
,p_attribute_02=>'POPUP'
,p_attribute_03=>'NONE'
,p_attribute_06=>'NONE'
,p_attribute_09=>'N'
,p_attribute_11=>'Y'
,p_attribute_12=>'MONTH-PICKER:YEAR-PICKER:TODAY-BUTTON'
,p_attribute_13=>'VISIBLE'
,p_attribute_15=>'FOCUS'
,p_is_required=>false
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_date_ranges=>'ALL'
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10421238131995423)
,p_name=>'OFFICIAL_WEBSITE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'OFFICIAL_WEBSITE'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Official Website'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>80
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>4000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10422267075995428)
,p_name=>'FREE_OF_CHARGE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'FREE_OF_CHARGE'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_SELECT_LIST'
,p_heading=>'Free Of Charge'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>90
,p_value_alignment=>'LEFT'
,p_is_required=>false
,p_lov_type=>'SHARED'
,p_lov_id=>wwv_flow_imp.id(10433015047005697)
,p_lov_display_extra=>false
,p_lov_display_null=>false
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'LOV'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10423201389995434)
,p_name=>'PRICE_PER_UNIT'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PRICE_PER_UNIT'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_NUMBER_FIELD'
,p_heading=>'Price Per Unit'
,p_heading_alignment=>'RIGHT'
,p_display_sequence=>100
,p_value_alignment=>'RIGHT'
,p_attribute_03=>'left'
,p_attribute_04=>'decimal'
,p_is_required=>false
,p_enable_filter=>true
,p_filter_is_required=>false
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10424287722995440)
,p_name=>'PRICE_UOM'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PRICE_UOM'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_SELECT_LIST'
,p_heading=>'Price Uom'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>110
,p_value_alignment=>'LEFT'
,p_is_required=>false
,p_lov_type=>'SHARED'
,p_lov_id=>wwv_flow_imp.id(10436185322026955)
,p_lov_display_extra=>true
,p_lov_display_null=>true
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'LOV'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10425272984995445)
,p_name=>'PRICE_CURRENCY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'PRICE_CURRENCY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>'Price Currency'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>120
,p_value_alignment=>'LEFT'
,p_attribute_01=>'N'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'TEXT'
,p_attribute_05=>'BOTH'
,p_is_required=>false
,p_max_length=>30
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10426292224995457)
,p_name=>'TOKEN_LIMIT'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'TOKEN_LIMIT'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Token Limit'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>130
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>4000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_control_break=>false
,p_enable_hide=>true
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10427232955995470)
,p_name=>'CREATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>140
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10428243215995479)
,p_name=>'CREATION_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATION_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>150
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10429255398995489)
,p_name=>'LAST_UPDATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>160
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10430279159995498)
,p_name=>'LAST_UPDATE_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATE_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>170
,p_attribute_01=>'Y'
,p_filter_is_required=>false
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_pivot=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_interactive_grid(
 p_id=>wwv_flow_imp.id(10414002680995370)
,p_internal_uid=>10414002680995370
,p_is_editable=>true
,p_edit_operations=>'i:u:d'
,p_lost_update_check_type=>'VALUES'
,p_add_row_if_empty=>true
,p_submit_checked_rows=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>true
,p_fixed_row_height=>true
,p_pagination_type=>'SCROLL'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
);
wwv_flow_imp_page.create_ig_report(
 p_id=>wwv_flow_imp.id(10414470031995375)
,p_interactive_grid_id=>wwv_flow_imp.id(10414002680995370)
,p_static_id=>'104145'
,p_type=>'PRIMARY'
,p_default_view=>'GRID'
,p_show_row_number=>false
,p_settings_area_expanded=>true
);
wwv_flow_imp_page.create_ig_report_view(
 p_id=>wwv_flow_imp.id(10414675571995375)
,p_report_id=>wwv_flow_imp.id(10414470031995375)
,p_view_type=>'GRID'
,p_srv_exclude_null_values=>false
,p_srv_only_display_columns=>true
,p_edit_mode=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10415700414995383)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>0
,p_column_id=>wwv_flow_imp.id(10415300725995382)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10416706509995392)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>1
,p_column_id=>wwv_flow_imp.id(10416316613995391)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10417615902995408)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>2
,p_column_id=>wwv_flow_imp.id(10417343103995407)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10418659859995411)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>3
,p_column_id=>wwv_flow_imp.id(10418221063995410)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10419697282995414)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>4
,p_column_id=>wwv_flow_imp.id(10419257188995413)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10420672121995420)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>5
,p_column_id=>wwv_flow_imp.id(10420258739995419)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10421634756995426)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>6
,p_column_id=>wwv_flow_imp.id(10421238131995423)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10422619174995430)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>7
,p_column_id=>wwv_flow_imp.id(10422267075995428)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10423669533995437)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>8
,p_column_id=>wwv_flow_imp.id(10423201389995434)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10424629079995442)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>9
,p_column_id=>wwv_flow_imp.id(10424287722995440)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10425623877995446)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>10
,p_column_id=>wwv_flow_imp.id(10425272984995445)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10426624375995459)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>11
,p_column_id=>wwv_flow_imp.id(10426292224995457)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10427630567995471)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>12
,p_column_id=>wwv_flow_imp.id(10427232955995470)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10428681806995484)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>13
,p_column_id=>wwv_flow_imp.id(10428243215995479)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10429669649995492)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>14
,p_column_id=>wwv_flow_imp.id(10429255398995489)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10430535659995499)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>15
,p_column_id=>wwv_flow_imp.id(10430279159995498)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10438536589064686)
,p_view_id=>wwv_flow_imp.id(10414675571995375)
,p_display_seq=>16
,p_column_id=>wwv_flow_imp.id(10393423205674614)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(10431133784995508)
,p_process_sequence=>10
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(10413518567995362)
,p_process_type=>'NATIVE_IG_DML'
,p_process_name=>'Model - Save Interactive Grid Data'
,p_attribute_01=>'REGION_SOURCE'
,p_attribute_05=>'Y'
,p_attribute_06=>'Y'
,p_attribute_08=>'Y'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>10431133784995508
);
wwv_flow_imp.component_end;
end;
/
