prompt --application/pages/page_00901
begin
--   Manifest
--     PAGE: 00901
--   Manifest End
wwv_flow_imp.component_begin (
 p_version_yyyy_mm_dd=>'2024.05.31'
,p_release=>'24.1.2'
,p_default_workspace_id=>5893639279394007
,p_default_application_id=>20011
,p_default_id_offset=>0
,p_default_owner=>'DEMO'
);
wwv_flow_imp_page.create_page(
 p_id=>901
,p_name=>'Vendor'
,p_alias=>'VENDOR'
,p_step_title=>'Vendor'
,p_autocomplete_on_off=>'OFF'
,p_page_template_options=>'#DEFAULT#'
,p_protection_level=>'C'
,p_page_component_map=>'21'
);
wwv_flow_imp_page.create_page_plug(
 p_id=>wwv_flow_imp.id(10392181630674601)
,p_plug_name=>'Vendor'
,p_region_template_options=>'#DEFAULT#'
,p_component_template_options=>'#DEFAULT#'
,p_plug_template=>wwv_flow_imp.id(10123076177629564)
,p_plug_display_sequence=>10
,p_query_type=>'TABLE'
,p_query_table=>'CB_VENDORS'
,p_include_rowid_column=>false
,p_plug_source_type=>'NATIVE_IG'
,p_prn_units=>'INCHES'
,p_prn_paper_size=>'LETTER'
,p_prn_width=>11
,p_prn_height=>8.5
,p_prn_orientation=>'HORIZONTAL'
,p_prn_page_header=>'Vendor'
,p_prn_page_header_font_color=>'#000000'
,p_prn_page_header_font_family=>'Helvetica'
,p_prn_page_header_font_weight=>'normal'
,p_prn_page_header_font_size=>'12'
,p_prn_page_footer_font_color=>'#000000'
,p_prn_page_footer_font_family=>'Helvetica'
,p_prn_page_footer_font_weight=>'normal'
,p_prn_page_footer_font_size=>'12'
,p_prn_header_bg_color=>'#EEEEEE'
,p_prn_header_font_color=>'#000000'
,p_prn_header_font_family=>'Helvetica'
,p_prn_header_font_weight=>'bold'
,p_prn_header_font_size=>'10'
,p_prn_body_bg_color=>'#FFFFFF'
,p_prn_body_font_color=>'#000000'
,p_prn_body_font_family=>'Helvetica'
,p_prn_body_font_weight=>'normal'
,p_prn_body_font_size=>'10'
,p_prn_border_width=>.5
,p_prn_page_header_alignment=>'CENTER'
,p_prn_page_footer_alignment=>'CENTER'
,p_prn_border_color=>'#666666'
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392343038674603)
,p_name=>'VENDOR_ID'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VENDOR_ID'
,p_data_type=>'NUMBER'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>true
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>30
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392412988674604)
,p_name=>'VENDOR_NAME'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VENDOR_NAME'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXT_FIELD'
,p_heading=>'Vendor Name'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>40
,p_value_alignment=>'LEFT'
,p_attribute_05=>'BOTH'
,p_is_required=>true
,p_max_length=>240
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_exact_match=>true
,p_filter_lov_type=>'DISTINCT'
,p_use_as_row_header=>false
,p_enable_sort_group=>true
,p_enable_control_break=>true
,p_enable_hide=>true
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392514275674605)
,p_name=>'VENDOR_DESCRIPTION'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'VENDOR_DESCRIPTION'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Vendor Description'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>50
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>4000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392673129674606)
,p_name=>'OFFICIAL_WEBSITE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'OFFICIAL_WEBSITE'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_TEXTAREA'
,p_heading=>'Official Website'
,p_heading_alignment=>'LEFT'
,p_display_sequence=>60
,p_value_alignment=>'LEFT'
,p_attribute_01=>'Y'
,p_attribute_02=>'N'
,p_attribute_03=>'N'
,p_attribute_04=>'BOTH'
,p_is_required=>false
,p_max_length=>4000
,p_enable_filter=>true
,p_filter_operators=>'C:S:CASE_INSENSITIVE:REGEXP'
,p_filter_is_required=>false
,p_filter_text_case=>'MIXED'
,p_filter_lov_type=>'NONE'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_enable_hide=>true
,p_is_primary_key=>false
,p_duplicate_value=>true
,p_include_in_export=>true
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392779266674607)
,p_name=>'CREATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>70
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392879004674608)
,p_name=>'CREATION_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'CREATION_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>80
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10392978107674609)
,p_name=>'LAST_UPDATED_BY'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATED_BY'
,p_data_type=>'VARCHAR2'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>90
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>':APP_USER'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10393070030674610)
,p_name=>'LAST_UPDATE_DATE'
,p_source_type=>'DB_COLUMN'
,p_source_expression=>'LAST_UPDATE_DATE'
,p_data_type=>'TIMESTAMP_LTZ'
,p_session_state_data_type=>'VARCHAR2'
,p_is_query_only=>false
,p_item_type=>'NATIVE_HIDDEN'
,p_display_sequence=>100
,p_attribute_01=>'Y'
,p_use_as_row_header=>false
,p_enable_sort_group=>false
,p_is_primary_key=>false
,p_default_type=>'EXPRESSION'
,p_default_language=>'SQL'
,p_default_expression=>'LOCALTIMESTAMP'
,p_duplicate_value=>true
,p_include_in_export=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10393138051674611)
,p_name=>'APEX$ROW_ACTION'
,p_session_state_data_type=>'VARCHAR2'
,p_item_type=>'NATIVE_ROW_ACTION'
,p_display_sequence=>20
,p_use_as_row_header=>false
);
wwv_flow_imp_page.create_region_column(
 p_id=>wwv_flow_imp.id(10393256521674612)
,p_name=>'APEX$ROW_SELECTOR'
,p_session_state_data_type=>'VARCHAR2'
,p_item_type=>'NATIVE_ROW_SELECTOR'
,p_display_sequence=>10
,p_attribute_01=>'Y'
,p_attribute_02=>'Y'
,p_attribute_03=>'N'
,p_use_as_row_header=>false
);
wwv_flow_imp_page.create_interactive_grid(
 p_id=>wwv_flow_imp.id(10392249164674602)
,p_internal_uid=>10392249164674602
,p_is_editable=>true
,p_edit_operations=>'i:u:d'
,p_lost_update_check_type=>'VALUES'
,p_add_row_if_empty=>false
,p_submit_checked_rows=>false
,p_lazy_loading=>false
,p_requires_filter=>false
,p_select_first_row=>true
,p_fixed_row_height=>true
,p_pagination_type=>'SCROLL'
,p_show_total_row_count=>true
,p_show_toolbar=>true
,p_enable_save_public_report=>false
,p_enable_subscriptions=>true
,p_enable_flashback=>true
,p_define_chart_view=>true
,p_enable_download=>true
,p_download_formats=>'CSV:HTML:XLSX:PDF'
,p_enable_mail_download=>true
,p_fixed_header=>'PAGE'
,p_show_icon_view=>false
,p_show_detail_view=>false
);
wwv_flow_imp_page.create_ig_report(
 p_id=>wwv_flow_imp.id(10397651215693735)
,p_interactive_grid_id=>wwv_flow_imp.id(10392249164674602)
,p_static_id=>'103977'
,p_type=>'PRIMARY'
,p_default_view=>'GRID'
,p_show_row_number=>false
,p_settings_area_expanded=>true
);
wwv_flow_imp_page.create_ig_report_view(
 p_id=>wwv_flow_imp.id(10397879674693741)
,p_report_id=>wwv_flow_imp.id(10397651215693735)
,p_view_type=>'GRID'
,p_srv_exclude_null_values=>false
,p_srv_only_display_columns=>true
,p_edit_mode=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10398335091693766)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>1
,p_column_id=>wwv_flow_imp.id(10392343038674603)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10399287775693783)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>2
,p_column_id=>wwv_flow_imp.id(10392412988674604)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10400195502693792)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>3
,p_column_id=>wwv_flow_imp.id(10392514275674605)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10400924977693801)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>4
,p_column_id=>wwv_flow_imp.id(10392673129674606)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10401846650693810)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>5
,p_column_id=>wwv_flow_imp.id(10392779266674607)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10402744490693818)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>6
,p_column_id=>wwv_flow_imp.id(10392879004674608)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10403600797693829)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>7
,p_column_id=>wwv_flow_imp.id(10392978107674609)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10404543663693838)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>8
,p_column_id=>wwv_flow_imp.id(10393070030674610)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_ig_report_column(
 p_id=>wwv_flow_imp.id(10406411941696627)
,p_view_id=>wwv_flow_imp.id(10397879674693741)
,p_display_seq=>0
,p_column_id=>wwv_flow_imp.id(10393138051674611)
,p_is_visible=>true
,p_is_frozen=>false
);
wwv_flow_imp_page.create_page_process(
 p_id=>wwv_flow_imp.id(10393347400674613)
,p_process_sequence=>10
,p_process_point=>'AFTER_SUBMIT'
,p_region_id=>wwv_flow_imp.id(10392181630674601)
,p_process_type=>'NATIVE_IG_DML'
,p_process_name=>'Vendor - Save Interactive Grid Data'
,p_attribute_01=>'REGION_SOURCE'
,p_attribute_05=>'Y'
,p_attribute_06=>'Y'
,p_attribute_08=>'Y'
,p_error_display_location=>'INLINE_IN_NOTIFICATION'
,p_internal_uid=>10393347400674613
);
wwv_flow_imp.component_end;
end;
/
